
 <D>estination    - Send code to speaker/port
 <I>/O Port       - Select port for CW I/O
 <J>ump Spaces    - Jump extra spaces in file
 <L>ine Port      - Select port for Online CW
 <M>anual Key     - Select key for manual sending
 <V>ideo Adapter  - Select video adapter type
 <T>iming Factor  - Set code speed timing factor
 <1>-<7>          - Set Screen colors

 <A>uto Calibrate - Automatic speed calibration
 <E>rase User     - Erase user statistice file
 <S>peed Test     - Determine current code speed
